Gain amp vs UTC time for J0203+1134.MULTI.1 SN 2 Rpol & Lpol IF 1 - 2

Plot file version 1 created 15-SEP-2005 12:32:54

1 JB IF 1R 710 705 700 695 1 JB IF 1L 690 685 680 675 1 JB IF 2R 715 710 705 700 1 JB IF 2L 885 880 875 870 2 WB IF 1R

1450 1440 1430 1420 2 WB IF 1L

MilliGain

960 940 920 2 WB IF 2R 940 930 920 910 2 WB IF 2L 950 940 930 3 EF IF 1R 990 985 980 975 3 EF IF 1L

TIME (HOURS)

04 19 20 21 22 23 24 25 26

1000 990 980 970

Gain amp vs UTC time for J0203+1134.MULTI.1 SN 2 Rpol & Lpol IF 1 - 2

Plot file version 2 created 15-SEP-2005 12:32:54

3 EF IF 2R

1000 980 960 3 EF IF 2L 990 980 970 4 ON IF 1R

1040 1020 1000 980 4 ON IF 1L

1040

1020

1000 4 ON IF 2R

1040 1020 1000 980 960 940 4 ON IF 2L

MilliGain

990 980 970 5 MC IF 1R

1000 950 900 5 MC IF 1L

1000 950 900 5 MC IF 2R

1180 1160 1140 1120 1100 1080 5 MC IF 2L

TIME (HOURS)

04 19 20 21 22 23 24 25 26

1000 980 960 940 920

Gain amp vs UTC time for J0203+1134.MULTI.1 SN 2 Rpol & Lpol IF 1 - 2

Plot file version 3 created 15-SEP-2005 12:32:54

6 TR IF 1R

1000 980 960 940 6 TR IF 1L 820 800 780 760 6 TR IF 2R

1120 1100 1080 1060 1040 1020

6 TR IF 2L 960 940 920 900 8 SH IF 1R

1100 1050 1000 950 8 SH IF 1L

MilliGain

1150 1100 1050 1000 950 8 SH IF 2R

1200

1100

1000

8 SH IF 2L

1150 1100 1050 1000 9 UR IF 1R

1000 950 900 9 UR IF 1L

TIME (HOURS)

04 19 20 21 22 23 24 25 26

950 900 850 800 750

Gain amp vs UTC time for J0203+1134.MULTI.1 SN 2 Rpol & Lpol IF 1 - 2

Plot file version 4 created 15-SEP-2005 12:32:54

9 UR IF 2R

1080 1070 1060 1050 9 UR IF 2L 895 890 885 880 875 10 CM IF 1R 920 910 900 10 CM IF 1L 980 960 940 10 CM IF 2R

1140 1120 1100 1080 10 CM IF 2L

MilliGain

1000 980 960 11 HH IF 1R 950 940 930 920 11 HH IF 1L

1040 1020 1000 11 HH IF 2R

1000 950 900 11 HH IF 2L

TIME (HOURS)

04 19 20 21 22 23 24 25 26

1150 1100 1050 1000