Gain amp vs UTC time for J2151+0709.MULTI.1 SN 2 Rpol & Lpol IF 1 - 2

Plot file version 1 created 15-SEP-2005 12:48:32

1 JB IF 1R 845 840 835 830 1 JB IF 1L 825 820 815 810 1 JB IF 2R 820 815 810 805 1 JB IF 2L 970 965 960 955 3 EF IF 1R

1060 1040 1020

3 EF IF 1L

MilliGain

1050

1000 950 3 EF IF 2R

1040 1020 1000 980 960 3 EF IF 2L

1000 950 900 4 ON IF 1R

1065 1060 1055 1050

4 ON IF 1L

TIME (HOURS)

08 16 17 18 19 20 21 22 23

1100 1050 1000

Gain amp vs UTC time for J2151+0709.MULTI.1 SN 2 Rpol & Lpol IF 1 - 2

Plot file version 2 created 15-SEP-2005 12:48:32

4 ON IF 2R

1100 1095 1090 1085

4 ON IF 2L

1050 1040 1030 1020 1010

5 MC IF 1R 950 940 930 920 5 MC IF 1L 940 920 900 5 MC IF 2R

1150

1100

1050

5 MC IF 2L

MilliGain

980 960 940 6 TR IF 1L 415 410 405 400 6 TR IF 2L

TIME (HOURS)

08 16 17 18 19 20 21 22 23

460 455 450 445