Gain phs vs UTC time for J2151+0709.MULTI.1 SN 1 Rpol & Lpol IF 1 - 2

Plot file version 1 created 15-SEP-2005 12:48:07

1 JB IF 1R

-1.090 -1.095 -1.100 -1.105 1 JB IF 1L 100 50 0 1 JB IF 2R

-0.580 -0.585 -0.590 -0.595 1 JB IF 2L

-0.015 -0.020 -0.025 -0.030

3 EF IF 1R

0.010 0.005 0.000 -0.005

3 EF IF 1L

Degrees

0.010 0.005 0.000 -0.005

3 EF IF 2R

0.010 0.005 0.000 -0.005

3 EF IF 2L

0.010 0.005 0.000 -0.005

4 ON IF 1R 2 0 -2 4 ON IF 1L

TIME (HOURS)

08 16 17 18 19 20 21 22 23

1 0 -1

Gain phs vs UTC time for J2151+0709.MULTI.1 SN 1 Rpol & Lpol IF 1 - 2

Plot file version 2 created 15-SEP-2005 12:48:08

4 ON IF 2R 2 1 0 -1 4 ON IF 2L 3 2 1 0 5 MC IF 1R 2 1 0 5 MC IF 1L 5 0 -5 5 MC IF 2R 4 2 0 -2 -4 -6 5 MC IF 2L

Degrees

2 0 -2 6 TR IF 1L

-5.910 -5.915 -5.920 -5.925 6 TR IF 2L

TIME (HOURS)

08 16 17 18 19 20 21 22 23

-4.405 -4.410 -4.415 -4.420