Gain amp vs UTC time for J2155+2250.MULTI.1 SN 2 Rpol & Lpol IF 1 - 2

Plot file version 1 created 15-SEP-2005 12:49:22

1 JB IF 1R

2.395 2.390 2.385 2.380

1 JB IF 1L

2.085 2.080 2.075 2.070

1 JB IF 2R

2.485 2.480 2.475 2.470

1 JB IF 2L

4.535 4.530 4.525 4.520

2 WB IF 1R

1.405 1.400 1.395 1.390

2 WB IF 1L

Gain

0.925 0.920 0.915 0.910

2 WB IF 2R

0.945 0.940 0.935 0.930

2 WB IF 2L

0.945 0.940 0.935 0.930

3 EF IF 1R

1.005 1.000 0.995 0.990

3 EF IF 1L

TIME (HOURS)

08 55 58.5 59.0 59.5 56 00.0 00.5

0.985 0.980 0.975 0.970

Gain amp vs UTC time for J2155+2250.MULTI.1 SN 2 Rpol & Lpol IF 1 - 2

Plot file version 2 created 15-SEP-2005 12:49:22

3 EF IF 2R

0.995 0.990 0.985 0.980

3 EF IF 2L

1.010 1.005 1.000 0.995

4 ON IF 1R

0.970 0.965 0.960 0.955

4 ON IF 1L

0.995 0.990 0.985 0.980

4 ON IF 2R

0.985 0.980 0.975 0.970

4 ON IF 2L

Gain

0.950 0.945 0.940 0.935

5 MC IF 1R

0.975 0.970 0.965 0.960

5 MC IF 1L

1.040 1.035 1.030 1.025

5 MC IF 2R

1.085 1.080 1.075 1.070

5 MC IF 2L

TIME (HOURS)

08 55 58.5 59.0 59.5 56 00.0 00.5

0.930 0.925 0.920 0.915

Gain amp vs UTC time for J2155+2250.MULTI.1 SN 2 Rpol & Lpol IF 1 - 2

Plot file version 3 created 15-SEP-2005 12:49:22

6 TR IF 1R

1.350 1.345 1.340 1.335

6 TR IF 1L

0.860 0.855 0.850 0.845

6 TR IF 2R

0.780 0.775 0.770 0.765

6 TR IF 2L

Gain

TIME (HOURS)

08 55 58.5 59.0 59.5 56 00.0 00.5

1.135 1.130 1.125 1.120