Gain phs vs UTC time for J2155+2250.MULTI.1 SN 1 Rpol & Lpol IF 1 - 2

Plot file version 1 created 15-SEP-2005 12:48:57

1 JB IF 1R

128.005 128.000 127.995 127.990 1 JB IF 1L

134.000 133.995 133.990 133.985 1 JB IF 2R

65.630 65.625 65.620 65.615

1 JB IF 2L

67.870 67.865 67.860 67.855

2 WB IF 1R

0.585 0.580 0.575 0.570

2 WB IF 1L

Degrees

0.705 0.700 0.695 0.690

2 WB IF 2R

-0.615 -0.620 -0.625 -0.630

2 WB IF 2L

-0.415 -0.420 -0.425 -0.430

3 EF IF 1R

0.010 0.005 0.000 -0.005

3 EF IF 1L

TIME (HOURS)

08 55 58.5 59.0 59.5 56 00.0 00.5

0.010 0.005 0.000 -0.005

Gain phs vs UTC time for J2155+2250.MULTI.1 SN 1 Rpol & Lpol IF 1 - 2

Plot file version 2 created 15-SEP-2005 12:48:57

3 EF IF 2R

0.010 0.005 0.000 -0.005

3 EF IF 2L

0.010 0.005 0.000 -0.005

4 ON IF 1R

-0.830 -0.835 -0.840 -0.845

4 ON IF 1L

0.190 0.185 0.180 0.175

4 ON IF 2R

0.140 0.135 0.130 0.125

4 ON IF 2L

Degrees

0.775 0.770 0.765 0.760

5 MC IF 1R

0.400 0.395 0.390 0.385

5 MC IF 1L

0.250 0.245 0.240 0.235

5 MC IF 2R

1.020 1.015 1.010 1.005

5 MC IF 2L

TIME (HOURS)

08 55 58.5 59.0 59.5 56 00.0 00.5

-0.350 -0.355 -0.360 -0.365

Gain phs vs UTC time for J2155+2250.MULTI.1 SN 1 Rpol & Lpol IF 1 - 2

Plot file version 3 created 15-SEP-2005 12:48:57

6 TR IF 1R

-2.290 -2.295 -2.300 -2.305 6 TR IF 1L

-0.305 -0.310 -0.315 -0.320 6 TR IF 2R

0.685 0.680 0.675 0.670

6 TR IF 2L

Degrees

TIME (HOURS)

08 55 58.5 59.0 59.5 56 00.0 00.5

0.070 0.065 0.060 0.055