Gain amp vs UTC time for J2212+2355.MULTI.1 SN 2 Rpol & Lpol IF 1 - 2

Plot file version 1 created 15-SEP-2005 13:23:23

1 JB IF 1R 835 830 825 820 1 JB IF 1L 820 815 810 805 1 JB IF 2R 790 785 780 775 1 JB IF 2L 950 945 940 935 3 EF IF 1R

1100 1080 1060 1040 1020

3 EF IF 1L

MilliGain

1040 1020 1000 980 3 EF IF 2R

1020 1000 980 960 940 3 EF IF 2L

1060 1040 1020 1000 980 4 ON IF 1R

1000 980 960 940 4 ON IF 1L

TIME (HOURS)

08 35 36 37 38 39 40 41 42

1040

1030

1020

Gain amp vs UTC time for J2212+2355.MULTI.1 SN 2 Rpol & Lpol IF 1 - 2

Plot file version 2 created 15-SEP-2005 13:23:23

4 ON IF 2R

1100 1050 1000 950 4 ON IF 2L

1050 1000 950 5 MC IF 1R 900 880 860 5 MC IF 1L 980 960 940 920 5 MC IF 2R

1220 1200 1180 1160

5 MC IF 2L

MilliGain

1050

1000 950 6 TR IF 1R

1240 1220 1200 1180

6 TR IF 1L 820 800 780 760 6 TR IF 2R 780 760 740 6 TR IF 2L

TIME (HOURS)

08 35 36 37 38 39 40 41 42

1120 1110 1100