Center at RA 22 12 05.96631 DEC 23 55 40.5438

CONT: J2212+23 IPOL 1656.365 MHZ J2212+2355.ICL001.5

PLot file version 1 created 15-SEP-2005 13:26:04

Cont peak flux = 3.3363E-01 JY/BEAM Levs = 3.336E-01 * (-0.320, 0.320, 0.640)

MilliARC SEC

MilliARC SEC

200 100 0 -100 -200

250

200

150

100

50

0

-50

-100

-150

-200

-250