Center at RA 22 17 00.82118 DEC 24 21 45.9579

CONT: J2217+24 IPOL 1656.365 MHZ J2217+2421.ICL001.5

PLot file version 1 created 15-SEP-2005 13:26:09

Cont peak flux = 4.1849E-01 JY/BEAM Levs = 4.185E-01 * (-0.058, 0.058, 0.115, 0.231, 0.462, 0.924)

MilliARC SEC

MilliARC SEC

200 100 0 -100 -200

250

200

150

100

50

0

-50

-100

-150

-200

-250