Gain amp vs UTC time for J2225+2118.MULTI.1 SN 2 Rpol & Lpol IF 1 - 2

Plot file version 1 created 15-SEP-2005 13:25:19

1 JB IF 1R 925 920 915 910 1 JB IF 1L 920 915 910 905 1 JB IF 2R 925 920 915 910 1 JB IF 2L

1125 1120 1115 1110 2 WB IF 1R

1100

1050

1000 2 WB IF 1L

MilliGain

720 700 680 2 WB IF 2R 740 720 700 680 660 2 WB IF 2L 740 720 700 680 3 EF IF 1R

1000 950 900 3 EF IF 1L

TIME (HOURS)

08 45 46 47 48 49 50 51 52

950 900 850

Gain amp vs UTC time for J2225+2118.MULTI.1 SN 2 Rpol & Lpol IF 1 - 2

Plot file version 2 created 15-SEP-2005 13:25:19

3 EF IF 2R 950 900 850 3 EF IF 2L 950 900 850 4 ON IF 1R

1150 1100 1050 1000 950 4 ON IF 1L

1150 1100 1050 1000

4 ON IF 2R

1100 1050 1000 950 4 ON IF 2L

MilliGain

1100 1050 1000 950 5 MC IF 1R 900 880 860 840 5 MC IF 1L

1000 950 900 5 MC IF 2R

1150 1100 1050 5 MC IF 2L

TIME (HOURS)

08 45 46 47 48 49 50 51 52

940 920 900

Gain amp vs UTC time for J2225+2118.MULTI.1 SN 2 Rpol & Lpol IF 1 - 2

Plot file version 3 created 15-SEP-2005 13:25:19

6 TR IF 1R

1200 1150 1100 6 TR IF 1L 780 760 740 720 6 TR IF 2R 720 700 680 660 6 TR IF 2L

MilliGain

TIME (HOURS)

08 45 46 47 48 49 50 51 52

1100

1050

1000