IF 1- 2 CH 1- 1 STK LL CC ver 0

Closure Phase vs Time for J2236+7322.UVSUB.1

PLot file version 1 created 15-SEP-2005 13:26:22

-75.5 -76.0 -76.5 -77.0

JB-EF-MC

125.0 124.5 124.0 123.5

JB-EF-TR

Degrees

180 175 170

JB-EF-SH

-153.5 -154.0 -154.5 -155.0

JB-EF-UR

TIME (HOURS)

07 47 45 48 00 15 30 45 49 00

-160.0 -160.5 -161.0 -161.5

JB-MC-TR

IF 1- 2 CH 1- 1 STK LL CC ver 0

Closure Phase vs Time for J2236+7322.UVSUB.1

PLot file version 2 created 15-SEP-2005 13:26:22

-123.0 -123.5 -124.0 -124.5

JB-MC-SH

-78.0 -78.5 -79.0 -79.5

JB-MC-UR

Degrees

47.5 47.0 46.5 46.0

JB-TR-SH

86.5 86.0 85.5 85.0

JB-TR-UR

TIME (HOURS)

07 47 45 48 00 15 30 45 49 00

58.0 57.5 57.0 56.5

JB-SH-UR

IF 1- 2 CH 1- 1 STK LL CC ver 0

Closure Phase vs Time for J2236+7322.UVSUB.1

PLot file version 3 created 15-SEP-2005 13:26:22

4 2 0 -2

EF-MC-TR

20 15 10 5 0 -5

EF-MC-SH

Degrees

0 -20 -40 -60

EF-MC-UR

100 0 -100

EF-MC-CM

TIME (HOURS)

07 47 45 48 00 15 30 45 49 00

150 100 50

EF-TR-SH

IF 1- 2 CH 1- 1 STK LL CC ver 0

Closure Phase vs Time for J2236+7322.UVSUB.1

PLot file version 4 created 15-SEP-2005 13:26:22 5 4 3 2 1

EF-TR-UR

0 -50 -100 -150

EF-TR-CM

Degrees

20 10 0 -10

EF-SH-UR

100 50 0 -50

EF-UR-CM

TIME (HOURS)

07 47 45 48 00 15 30 45 49 00

140 120 100 80 60 40 20

MC-TR-SH

IF 1- 2 CH 1- 1 STK LL CC ver 0

Closure Phase vs Time for J2236+7322.UVSUB.1

PLot file version 5 created 15-SEP-2005 13:26:22

80 60 40 20

MC-TR-UR

0

-50

-100

MC-TR-CM

Degrees

80 60 40 20

MC-SH-UR

50 0 -50

MC-UR-CM

TIME (HOURS)

07 47 45 48 00 15 30 45 49 00

140 120 100 80 60 40 20

TR-SH-UR

IF 1- 2 CH 1- 1 STK LL CC ver 0

Closure Phase vs Time for J2236+7322.UVSUB.1

PLot file version 6 created 15-SEP-2005 13:26:22

-75 -76 -77 -78 -79

TR-UR-CM

IF 1- 2 CH 1- 1 STK RR CC ver 0

Closure Phase vs Time for J2236+7322.UVSUB.1

PLot file version 7 created 15-SEP-2005 13:26:22

138.0 137.5 137.0 136.5

JB-EF-MC

45.0 44.5 44.0 43.5

JB-EF-TR

Degrees

132.0 131.5 131.0 130.5

JB-EF-SH

97.0 96.5 96.0 95.5

JB-EF-UR

TIME (HOURS)

07 47 45 48 00 15 30 45 49 00

-105.5 -106.0 -106.5 -107.0

JB-MC-TR

IF 1- 2 CH 1- 1 STK RR CC ver 0

Closure Phase vs Time for J2236+7322.UVSUB.1

PLot file version 8 created 15-SEP-2005 13:26:22

26.5 26.0 25.5 25.0

JB-MC-SH

-38.0 -38.5 -39.0 -39.5

JB-MC-UR

Degrees

119.0 118.5 118.0 117.5

JB-TR-SH

54.0 53.5 53.0 52.5

JB-TR-UR

TIME (HOURS)

07 47 45 48 00 15 30 45 49 00

-26.0 -26.5 -27.0 -27.5

JB-SH-UR

IF 1- 2 CH 1- 1 STK RR CC ver 0

Closure Phase vs Time for J2236+7322.UVSUB.1

PLot file version 9 created 15-SEP-2005 13:26:22

20 10 0 -10

EF-MC-TR

50 0 -50 -100

EF-MC-SH

Degrees

0 -50 -100 -150

EF-MC-UR

100 80 60 40 20 0

EF-MC-CM

TIME (HOURS)

07 47 45 48 00 15 30 45 49 00

30 20 10 0 -10

EF-TR-SH

IF 1- 2 CH 1- 1 STK RR CC ver 0

Closure Phase vs Time for J2236+7322.UVSUB.1

PLot file version 10 created 15-SEP-2005 13:26:22 2 1 0 -1 -2

EF-TR-UR

200 100 0 -100

EF-TR-CM

Degrees

10 0 -10 -20

EF-SH-UR

100 50 0

EF-UR-CM

TIME (HOURS)

07 47 45 48 00 15 30 45 49 00

100 50 0

MC-TR-SH

IF 1- 2 CH 1- 1 STK RR CC ver 0

Closure Phase vs Time for J2236+7322.UVSUB.1

PLot file version 11 created 15-SEP-2005 13:26:22 200 150 100 50 0

MC-TR-UR

50 0 -50 -100

MC-TR-CM

Degrees

40 30 20 10

MC-SH-UR

50 0 -50 -100 -150

MC-UR-CM

TIME (HOURS)

07 47 45 48 00 15 30 45 49 00

40 20 0 -20

TR-SH-UR

IF 1- 2 CH 1- 1 STK RR CC ver 0

Closure Phase vs Time for J2236+7322.UVSUB.1

PLot file version 12 created 15-SEP-2005 13:26:22

100 50 0

TR-UR-CM