Center at RA 22 36 38.59701 DEC 73 22 52.6623

CONT: J2236+73 IPOL 1656.365 MHZ J2236+7322.ICL001.5

PLot file version 1 created 15-SEP-2005 13:26:20

Cont peak flux = 1.2765E-01 JY/BEAM Levs = 1.277E-01 * (-0.083, 0.083, 0.166, 0.332, 0.663)

MilliARC SEC

MilliARC SEC

200 100 0 -100 -200

250

200

150

100

50

0

-50

-100

-150

-200

-250