Center at RA 19 33 21.80503 DEC 15 04 46.4001

CONT: J1933+15 IPOL 1611.290 MHZ J1933+1504.IIM001.2

PLot file version 1 created 23-SEP-2004 17:28:59

Cont peak flux = 3.7067E-01 JY/BEAM Levs = 3.707E-01 * (-0.200, 0.200, 0.400, 0.800)

MilliARC SEC

MilliARC SEC

200 100 0 -100 -200

250

200

150

100

50

0

-50

-100

-150

-200

-250