Tsys vs UTC time for rah2.MSORT.1 TY 1 Rpol & Lpol IF 1

Plot file version 1 created 23-SEP-2004 17:24:27

1R WB 50 40 30 1L WB 50 40 30 2R TR

70.11

70.10

70.09 2L TR 59.005 59.000 58.995

3R ON 80 60 40 3L ON

Kelvin

80 60 40 20 4R CM 1.005 1.000 0.995

4L CM

TIME (HOURS)

14 15 16 17 18 19 20 21 22

1.005 1.000 0.995