Center at RA 06 51 45.80513 DEC 22 04 27.0129

CONT: B0648+22 IPOL 1455.990 MHZ B0648+221.IIM001.2

PLot file version 1 created 23-SEP-2004 11:40:40

Cont peak flux = -1.4778E-03 JY/BEAM Levs = 1.363E-03 * (-0.200, 0.200, 0.400, 0.800)

MilliARC SEC

MilliARC SEC

200 100 0 -100 -200

250

200

150

100

50

0

-50

-100

-150

-200

-250