Center at RA 06 45 24.10000 DEC 21 21 51.2020

CONT: J0645+21 IPOL 1455.990 MHZ J0645+213.ICL001.5

PLot file version 1 created 23-SEP-2004 11:41:06

Cont peak flux = 7.0011E-02 JY/BEAM Levs = 7.001E-02 * (-0.186, 0.186, 0.372, 0.745)

MilliARC SEC

MilliARC SEC

200 100 0 -100 -200

250

200

150

100

50

0

-50

-100

-150

-200

-250