Gain amp vs UTC time for DA193.MULTI.1 SN 2 Rpol & Lpol IF 1 - 2

Plot file version 1 created 14-JUL-2004 14:52:10

1 EF IF 1L 1.2 1.1 1.0 2 WB IF 1L

0.98 0.96 0.94

3 ON IF 1L

1.02 1.00 0.98 0.96

6 NT IF 1L

Gain

TIME (HOURS)

09 00 30 10 00 30 11 00 30 12 00 30

2.0 1.5 1.0