Delay vs UTC time for n04u1.MSORT.1 SN 2 Rpol & Lpol IF 1 - 2

Plot file version 1 created 14-JUL-2004 14:51:10

1 EF IF 1R 0.000

1 EF IF 1L 0.000

1 EF IF 2R 0.000

1 EF IF 2L 0.000

2 WB IF 1R

-0.016 -0.018 -0.020 -0.022 -0.024 2 WB IF 1L

MicroSeconds

-0.018 -0.020 -0.022 -0.024 -0.026

2 WB IF 2R

-0.040 -0.042 -0.044 -0.046 2 WB IF 2L

-0.026 -0.028 -0.030 -0.032 -0.034

3 ON IF 1R

0.000

-0.005

-0.010

3 ON IF 1L

TIME (HOURS)

09 00 30 10 00 30 11 00 30 12 00 30

0.005

0.000

-0.005

Delay vs UTC time for n04u1.MSORT.1 SN 2 Rpol & Lpol IF 1 - 2

Plot file version 2 created 14-JUL-2004 14:51:10

3 ON IF 2R

-0.010 -0.015 -0.020 -0.025

6 NT IF 1L 8 6 4 2 0 6 NT IF 2L

MicroSeconds

TIME (HOURS)

09 00 30 10 00 30 11 00 30 12 00 30

0.00

-0.01

-0.02