Gain amp vs UTC time for n04u1.MSORT.1 CL 2 Rpol & Lpol IF 1 - 2

Plot file version 1 created 14-JUL-2004 14:47:35

1 EF IF 1R

8.065 8.060 8.055 8.050 1 EF IF 1L

8.065 8.060 8.055 8.050 1 EF IF 2R

8.065 8.060 8.055 8.050 1 EF IF 2L

8.065 8.060 8.055 8.050 2 WB IF 1R

10.985 10.980 10.975 10.970

2 WB IF 1L

Gain

10.985 10.980 10.975 10.970

2 WB IF 2R

10.985 10.980 10.975 10.970

2 WB IF 2L

10.985 10.980 10.975 10.970

3 ON IF 1R 38 36 34 32 3 ON IF 1L

TIME (HOURS)

09 00 30 10 00 30 11 00 30 12 00 30

38 36 34 32 30

Gain amp vs UTC time for n04u1.MSORT.1 CL 2 Rpol & Lpol IF 1 - 2

Plot file version 2 created 14-JUL-2004 14:47:35

3 ON IF 2R

31.5

31.0

3 ON IF 2L 30 29 28 5 UR IF 1L 82 80 78 76 5 UR IF 2L 80 79 78 6 NT IF 1L

30.160 30.155 30.150 30.145

6 NT IF 2L

Gain

TIME (HOURS)

09 00 30 10 00 30 11 00 30 12 00 30

30.160 30.155 30.150 30.145