Tsys vs UTC time for n04u1.MSORT.1 TY 1 Rpol & Lpol IF 1 - 2

Plot file version 1 created 14-JUL-2004 14:47:33

1 EF IF 1R

1.005 1.000 0.995

1 EF IF 1L

1.005 1.000 0.995

1 EF IF 2R

1.005 1.000 0.995

1 EF IF 2L

1.005 1.000 0.995

2 WB IF 1R

1.005 1.000 0.995

2 WB IF 1L

Kelvin

1.005 1.000 0.995

2 WB IF 2R

1.005 1.000 0.995

2 WB IF 2L

1.005 1.000 0.995

3 ON IF 1R 120 100 80 3 ON IF 1L

TIME (HOURS)

09 00 30 10 00 30 11 00 30 12 00 30

120 100 80

Tsys vs UTC time for n04u1.MSORT.1 TY 1 Rpol & Lpol IF 1 - 2

Plot file version 2 created 14-JUL-2004 14:47:33

3 ON IF 2R 84 82 80 78 3 ON IF 2L 75 70 65 5 UR IF 1L 380 360 340 5 UR IF 2L 380 370 360 6 NT IF 1L

1.005 1.000 0.995

6 NT IF 2L

Kelvin

TIME (HOURS)

09 00 30 10 00 30 11 00 30 12 00 30

1.005 1.000 0.995