Center at RA 20 32 25.77330 DEC 40 57 27.9650

CONT: CYGX-3 IPOL 4991.771 MHZ CYGX-3.ICL001.3

PLot file version 1 created 13-DEC-2002 15:03:45

Cont peak flux = -1.0729E-02 JY/BEAM Levs = 1.068E-02 * (-0.216, 0.216, 0.432, 0.865)

MilliARC SEC

MilliARC SEC

100 50 0 -50 -100

100

80

60

40

20

0

-20

-40

-60

-80

-100