Tsys vs UTC time for uah5.MSORT.1 TY 1 Lpol IF 1 - 8

Plot file version 1 created 13-DEC-2002 14:49:13

1L JB IF 1

0.001

1L JB IF 2

0.001

1L JB IF 3

0.001

1L JB IF 4

0.001

1L JB IF 5

0.001

1L JB IF 6

Kilo Kelvin

0.001

1L JB IF 7

0.001

1L JB IF 8

0.001

2L WB IF 1

0.10 0.09 0.08 0.07

2L WB IF 2

TIME (HOURS)

00 02 04 06 08 10

0.10 0.09 0.08 0.07

Tsys vs UTC time for uah5.MSORT.1 TY 1 Lpol IF 1 - 8

Plot file version 2 created 13-DEC-2002 14:49:13

2L WB IF 3

0.09 0.08 0.07 0.06

2L WB IF 4

0.09 0.08 0.07 0.06

2L WB IF 5

0.09 0.08 0.07 0.06

2L WB IF 6

0.10

0.08

0.06

2L WB IF 7

0.10

0.08

0.06

2L WB IF 8

Kilo Kelvin

0.11 0.10 0.09 0.08 0.07

4L MC IF 1

0.060 0.055 0.050

4L MC IF 2

0.060 0.055 0.050

4L MC IF 3

0.060 0.055 0.050 4L MC IF 4

TIME (HOURS)

00 02 04 06 08 10

0.060 0.055 0.050 0.045

Tsys vs UTC time for uah5.MSORT.1 TY 1 Lpol IF 1 - 8

Plot file version 3 created 13-DEC-2002 14:49:13

4L MC IF 5

0.060 0.055 0.050 4L MC IF 6

0.060 0.055 0.050

4L MC IF 7

0.060 0.055 0.050

4L MC IF 8

0.065 0.060 0.055 0.050 5L NT IF 1

0.058 0.056 0.054 0.052 0.050 0.048

5L NT IF 2

Kilo Kelvin

0.054 0.052 0.050 0.048

5L NT IF 3

0.054 0.052 0.050 0.048 0.046 5L NT IF 4

0.050 0.048 0.046 0.044

5L NT IF 5

0.038 0.036 0.034 0.032 5L NT IF 6

TIME (HOURS)

00 02 04 06 08 10

0.050 0.048 0.046 0.044

Tsys vs UTC time for uah5.MSORT.1 TY 1 Lpol IF 1 - 8

Plot file version 4 created 13-DEC-2002 14:49:13

5L NT IF 7

0.048 0.046 0.044 0.042

5L NT IF 8

0.050 0.048 0.046 0.044

6L TR IF 1 1.0 0.5 0.0 6L TR IF 2 0.8 0.6 0.4 0.2 0.0 6L TR IF 3 0.8 0.6 0.4 0.2 0.0 6L TR IF 4

Kilo Kelvin

0.8 0.6 0.4 0.2 0.0 6L TR IF 5 1.0 0.5 0.0 6L TR IF 6 1.0 0.5 0.0 6L TR IF 7 1.0 0.5 0.0 6L TR IF 8

TIME (HOURS)

00 02 04 06 08 10

1.0 0.5 0.0